இடிந்து விழுந்த கட்டிடத்திலிருந்து பிறந்த குழந்தை காப்பாற்றப்பட்டது

துருக்கி-சிரியா நிலநடுக்கம்: இடிந்து விழுந்த கட்டிடத்திலிருந்து பிறந்த குழந்தை காப்பாற்றப்பட்டது.

வடமேற்கு சிரியாவில் திங்கட்கிழமையன்று ஏற்பட்ட நிலநடுக்கத்தால் இடிந்த கட்டிடத்தின் இடிபாடுகளுக்கு அடியில் இருந்து புதிதாகப் பிறந்த பெண் குழந்தை ஒன்று மீட்புப் படையினரால் காப்பாற்றப்பட்டுள்ளது.  அவரது தாயார் பேரழிவுக்குப் பிறகு விரைவில் பிரசவத்திற்குச் சென்றார். மேலும் அவர் இறப்பதற்கு முன்பு பிரசவித்தார் என்று உறவினர் ஒருவர் கூறினார்.

துருக்கிய எல்லைக்கு அருகில் உள்ள இட்லிப் மாகாணத்தில் எதிர்க்கட்சிகளின் கட்டுப்பாட்டில் உள்ள நகரமான ஜிண்டாய்ரிஸில் 7.8 ரிக்டர் அளவிலான நிலநடுக்கத்தால் அழிக்கப்பட்டதாகக் கூறப்படும் 50 கட்டிடங்களில் அவரது குடும்பம் வாழ்ந்த கட்டிடமும் ஒன்றாகும்.  குழந்தையின் மாமா, கலீல் அல்-சுவாதி, சரிவு பற்றி அறிந்ததும் உறவினர்கள் சம்பவ இடத்திற்கு விரைந்தனர்.

“நாங்கள் தோண்டும்போது ஒரு குரல் கேட்டது,” என்று அவர் செவ்வாயன்று AFP செய்தி நிறுவனத்திடம் கூறினார். “நாங்கள் தூசியை அகற்றி, தொப்புள் கொடியுடன் குழந்தையைக் கண்டுபிடித்தோம், அதனால் நாங்கள் அதை வெட்டி, குழந்தையை மருத்துவமனைக்கு அழைத்துச் சென்றோம்.”  குழந்தை நல மருத்துவர் ஹானி மரூஃப் கூறுகையில், “குழந்தை உடல் முழுவதும் பல காயங்கள்.  குழந்தை மோசமான நிலையில்  மருத்துவமனைக்கு வந்தது.  கடுமையான குளிரின் காரணமாக குழந்தை தாழ்வெப்பநிலையுடன் வந்தது. நாங்கள் குழந்தையை சூடுபடுத்தி கால்சியம் கொடுக்க வேண்டியிருந்தது,” என்று அவர்  கூறினார்.

வடமேற்கில் உள்ள மக்களுக்கு உதவிகளைப் பெறுவதற்கு அனைத்து வழிகளையும்” பயன்படுத்துவதாக ஐ.நா உறுதியளித்துள்ளது. ஆனால் சேதமடைந்த சாலைகள் மற்றும் பிற தளவாட சிக்கல்கள் காரணமாக விநியோகங்கள் தற்காலிகமாக நிறுத்தப்பட்டுள்ளதாக கூறியுள்ளது.  பலர் மிகவும் அவநம்பிக்கையில் இருக்கும்போது உதவி வழங்குவதை அரசியலாக்க வேண்டாம் என்றும் அது அரசாங்கங்களை வலியுறுத்தியுள்ளது.

The post இடிந்து விழுந்த கட்டிடத்திலிருந்து பிறந்த குழந்தை காப்பாற்றப்பட்டது first appeared on virtualtrade.me.